---
title: Error Code 5
description: Error Code 5 usually means Radium is having trouble reaching one of its services.
---

# Error Code: 5

Error Code 5 usually means Radium is having trouble reaching one of its services. This is often temporary and may happen during high traffic, maintenance, or a partial service outage.

## Common Causes

* High traffic on Radium services
* Temporary server connectivity issues
* Scheduled maintenance
* A partial outage affecting one of Radium's backend services

## What To Try

1. Wait a few minutes, then try again.
2. Restart Radium.
3. Check whether other players are reporting the same issue.
4. If the error continues, try again later.